\documentclass[12pt]{article}
\usepackage{makeidx}
\usepackage{multirow}
\usepackage{multicol}
\usepackage[dvipsnames,svgnames,table]{xcolor}
\usepackage{graphicx}
\usepackage{epstopdf}
\usepackage{ulem}
\usepackage{hyperref}
\usepackage{amsmath}
\usepackage{amssymb}
\author{}
\title{CNTAC 2017A}
\usepackage[paperwidth=600pt,paperheight=780pt,top=38pt,right=40pt,bottom=40pt,left=40pt]{geometry}

\begin{document}


\texttt{\textbf{SCIENTIFIC AIM AND RATIONALE} \\ }

{\raggedright

\vspace{3pt} \noindent
\begin{tabular}{|p{514pt}|}
\hline
\parbox{514pt} {\raggedright \vspace{3pt} The maximum length of this
  file is \textbf{5 pages} (7 for long-term, large programs) and it
  must include the following aspects: scientific aim and rationale
  (3-page limit including figures/tables and references), description
  of the current status of the project including publications (1-page
  limit), technical description (1-page limit), justification for
  long-term status if applicable (1 page limit) and work plan for
  large-programs (1-page limit). \textbf{This template must not be
    edited.}} \\ \hline
\end{tabular}
\vspace{2pt}
}

Begin writing here.


\clearpage
\texttt{\textbf{CURRENT STATUS OF THE PROJECT} \\ }

\clearpage
\texttt{\textbf{TECHNICAL DESCRIPTION} \\ }



\end{document}
